\clan {Vojko Jazbin�ek}

%--------------------------------------------------------
%  B. raziskovalni clanki sprejeti v objavo v znanstvenih
%     revijah in v zbornikih konferenc
%--------------------------------------------------------

\begin{skupina}{B}

\sprejetoRevija
   {Z. Trontelj, G. Thiel, \crta}
   {Magnetic measurements in plant electrophysiology}
   {monografijo Plant Electrophysiology -- Theory and Methods}

\end{skupina} 

%--------------------------------------------------------
%  C. raziskovalni clanki objavljeni v znanstvenih revijah
%     in v zbornikih konferenc
%--------------------------------------------------------

\begin{skupina}{C}

\objavljenoRevija
% 1.01: {\bf 1}. BAUDENBACHER, Franz, FONG, Luis E., THIEL, Gerhard, WACKE, Michael,
% JAZBIN\v{S}EK, Vojko, HOLZER, Jenny R., \v{S}TAMPFL, Ale\v{s}, TRONTELJ, Zvonko.
% Intracellular axial current in Chara carollina reflects the altered kinetics of ions in cytoplasm under the influence of light. {\it Biophys. j.}, 2005, vol. 88, no. 1, str. 690-697. http://www.biophysj.org/cgi/content/abstract/88/1/690. $[$COBISS.SI-ID 13287001$]$\\ 
   {F.~Baudenbacher, L.~E.~Fong, G.~Thiel, M.~Wacke, \crta,
    J.~R.~Holzer, A.~\v{S}tampfl, Z.~Trontelj}
   {Intracellular axial current in Chara carollina reflects the altered
    kinetics of ions in cytoplasm under the influence of light}
   {Biophys.\ J.} {88} {2005} {1} {690--697}

\objavljenoRevija
% 1.01: %list {\bf 2}. JAZBIN\v{S}EK, Vojko, HREN, Rok, TRONTELJ, Zvonko. High resolution ECG and MCG mapping: simulation study of single and dual accessory pathways and influence of lead displacement and limited lead selection on localisation results. {\it Bull. Pol. Acad. Sci., Tech. Sci.}, 2005, vol. 53, issue 3, str. 195-205. $[$COBISS.SI-ID 13771609$]$\\ 
%POZOR: bibliografije.tex > 2005\fiz\clani\jazbinsek.tex 5140/86: Ne najdem podatka {STEVILKA}
   {\crta, R.~Hren, Z.~Trontelj}
   {High resolution ECG and MCG mapping: simulation study of single and dual
    accessory pathways and influence of lead displacement and limited lead
    selection on localisation results}
   {Bull.\ Pol.\ Acad.\ Sci., Tech.\ Sci.} {53} {2005} {} {195--205}

\objavljenoZbornik
   {\crta, J.~Lu\v{z}nik, Z.~Trontelj}
   {Non-invasive blood pressure measurements: separation of the arterial pressure
    oscillometric waveform from the deflation using digital filtering}
   {European Medical and Biological Engineering Conference}
   {Praga} {�e�ka} {november} {2005}
   {{\sc ifmbe} Proceedings, Vol.~11} {3171--3174} 

\objavljenoZbornik
   {\crta, J.~Lu\v{z}nik, Z.~Trontelj}
   {Averaging oscillometric non-invasive blood pressure recordings: transformation
    into the normalised view}
   {European Medical and Biological Engineering Conference}
   {Praga} {�e�ka} {november} {2005}
   {{\sc ifmbe} Proceedings, Vol.~11} {3187--3190} 

\objavljenoZbornik
% 1.08: %list {\bf 5}. JAZBIN\v{S}EK, Vojko, LU\v{Z}NIK, Janko, TRONTELJ, Zvonko. 
% Frekven\v{c}na analiza in prikaz signalov posnetih med neinvazivnim merjenjem
% krvnega tlaka. V: ZAJC, Baldomir (ur.), TROST, Andrej (ur.). {\it Zbornik
% \v{s}tirinajste mednarodne Elektrotehni\v{s}ke in ra\v{c}unalni\v{s}ke konference ERK 2005, 26. - 28. september 2005, Portoro\v{z}, Slovenija}, (Zbornik ... Elektrotehni\v{s}ke in ra\v{c}unalni\v{s}ke konference ERK ...). Ljubljana: IEEE Region 8, Slovenska sekcija IEEE, 2005, b, str. 269-272. $[$COBISS.SI-ID 13771353$]$\\ 
%POZOR: bibliografije.tex > 2005\fiz\clani\jazbinsek.tex 5173/110: Ne najdem podatka {ZBORNIK}
   {\crta, J.~Lu\v{z}nik, Z.~Trontelj}
   {Frekven\v{c}na analiza in prikaz signalov posnetih med neinvazivnim merjenjem
    krvnega tlaka}
   {14.~mednarodna elektrotehni\v{s}ka in ra\v{c}unalni\v{s}ka
    konferenca {\sc erk} 2005}
   {Portoro�} {} {september} {2005}
   {zbornik} {269--272} 

\objavljenoRevija
% 1.01: %list {\bf 3}. PODOBNIK, Boris, IVANOV, Plamen Ch., JAZBIN\v{S}EK, Vojko,
% TRONTELJ, Zvonko, STANLEY, Harry Eugene, GROSSE, Ivo.
% Power-law correlated processes with asymmetric distributions.
% {\it Phys. rev., E Stat. phys. plasmas fluids relat.}, 2005, vol. 71, no. 2,
% 025104(R) $[$4 str.$]$.
% http://scitation.aip. org/getabs/servlet/GetabsServlet?prog=normal\&id=PLEEE8000071000002025104000 001\&idtype=cvips\&gifs=Yes. $[$COBISS.SI-ID 13399897$]$\\ 
   {B.~Podobnik, P.~C.~Ivanov, \crta, Z.~Trontelj, H.~E.~Stanley, I.~Grosse}
   {Power-law correlated processes with asymmetric distributions}
   {Phys.\ Rev., E Stat.\ Phys.} {71} {2005} {2} {025104--1--4}

\end{skupina} 

%--------------------------------------------------------
%  G. aktivne udelezbe na mednarodnih in domacih
%     konferencah
%--------------------------------------------------------

\begin{skupina}{G}

%\konferenca
%   {Electrophysiologic study of AP in Chara corallina -
%    Indication of its biochemical nature}
%   {{\supers{15}{th}} {\sc iupab} \& {\supers{5}{th}} {\sc ebsa}
%    International Biophysical Congress} {Montpelier} {Francija} {avgust} {2005} 


\konferenca
% 1.08: %list {\bf 5}. JAZBIN\v{S}EK, Vojko, LU\v{Z}NIK, Janko, TRONTELJ, Zvonko. Frekven\v{c}na analiza in prikaz signalov posnetih med neinvazivnim merjenjem krvnega tlaka. V: ZAJC, Baldomir (ur.), TROST, Andrej (ur.). {\it Zbornik \v{s}tirinajste mednarodne Elektrotehni\v{s}ke in ra\v{c}unalni\v{s}ke konference ERK 2005, 26. - 28. september 2005, Portoro\v{z}, Slovenija}, (Zbornik ... Elektrotehni\v{s}ke in ra\v{c}unalni\v{s}ke konference ERK ...). Ljubljana: IEEE Region 8, Slovenska sekcija IEEE, 2005, b, str. 269-272. $[$COBISS.SI-ID 13771353$]$\\ 
   {Frekven\v{c}na analiza in prikaz signalov posnetih med neinvazivnim merjenjem krvnega tlaka}
   {14.~mednarodna Elektrotehni\v{s}ka in ra\v{c}unalni\v{s}ka konferenca {\sc erk} 2005}
   {Portoro�} {} {september} {2005} 

\konferenca
% 1.08: %list {\bf 5}. JAZBIN\v{S}EK, Vojko, LU\v{Z}NIK, Janko, TRONTELJ, Zvonko. Frekven\v{c}na analiza in prikaz signalov posnetih med neinvazivnim merjenjem krvnega tlaka. V: ZAJC, Baldomir (ur.), TROST, Andrej (ur.). {\it Zbornik \v{s}tirinajste mednarodne Elektrotehni\v{s}ke in ra\v{c}unalni\v{s}ke konference ERK 2005, 26. - 28. september 2005, Portoro\v{z}, Slovenija}, (Zbornik ... Elektrotehni\v{s}ke in ra\v{c}unalni\v{s}ke konference ERK ...). Ljubljana: IEEE Region 8, Slovenska sekcija IEEE, 2005, b, str. 269-272. $[$COBISS.SI-ID 13771353$]$\\ 
%POZOR: bibliografije.tex > 2005\fiz\clani\jazbinsek.tex 5173/110: Ne najdem podatka {ZBORNIK}
   {Non-invasive blood pressure measurements: separation of the arterial pressure oscillometric waveform from the deflation using digital filtering}
   {European Medical and Biological Engineering Conference {\sc embec} 05}
   {Praga} {�e�ka} {november} {2005}

\konferenca
% 1.08: %list {\bf 5}. JAZBIN\v{S}EK, Vojko, LU\v{Z}NIK, Janko, TRONTELJ, Zvonko. Frekven\v{c}na analiza in prikaz signalov posnetih med neinvazivnim merjenjem krvnega tlaka. V: ZAJC, Baldomir (ur.), TROST, Andrej (ur.). {\it Zbornik \v{s}tirinajste mednarodne Elektrotehni\v{s}ke in ra\v{c}unalni\v{s}ke konference ERK 2005, 26. - 28. september 2005, Portoro\v{z}, Slovenija}, (Zbornik ... Elektrotehni\v{s}ke in ra\v{c}unalni\v{s}ke konference ERK ...). Ljubljana: IEEE Region 8, Slovenska sekcija IEEE, 2005, b, str. 269-272. $[$COBISS.SI-ID 13771353$]$\\ 
%POZOR: bibliografije.tex > 2005\fiz\clani\jazbinsek.tex 5173/110: Ne najdem podatka {ZBORNIK}
   {Averaging oscillometric non-invasive blood pressure recordings: transformation into the normalised view}
   {European Medical and Biological Engineering Conference {\sc embec} 05}
   {Praga} {�e�ka} {november} {2005}

\end{skupina} 