\clan {Rok Hren}

%--------------------------------------------------------
%  A. objavljene znanstvene monografije
%--------------------------------------------------------

%\begin{skupina}{A}

%\disertacija
%   {NASLOV}
%   {UNIVERZA}
%   {FAKULTETA}
%   {ODDELEK}
%   {KRAJ} {DRZAVA} {LETO} 

%\magisterij
%   {NASLOV}
%   {UNIVERZA}
%   {FAKULTETA}
%   {ODDELEK}
%   {KRAJ} {DRZAVA} {LETO} 

%\monografija
%   {AVTORJI}
%   {NASLOV}
%   {ZALOZBA}
%   {KRAJ} {DRZAVA} {LETO} 

%\end{skupina} 

%   Ni podatkov za to sekcijo

%--------------------------------------------------------
%  B. raziskovalni clanki sprejeti v objavo v znanstvenih
%     revijah in v zbornikih konferenc
%--------------------------------------------------------

%\begin{skupina}{B}

%\sprejetoRevija
%   {AVTORJI}
%   {NASLOV}
%   {REVIJA}
%\sprejetoZbornik
%   {AVTORJI}
%   {NASLOV}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%\end{skupina} 


%   Ni podatkov za to sekcijo

%--------------------------------------------------------
%  C. raziskovalni clanki objavljeni v znanstvenih revijah
%     in v zbornikih konferenc
%--------------------------------------------------------

%\begin{skupina}{C}

%\objavljenoRevija
%   {AVTORJI}
%   {NASLOV}
%   {REVIJA} {LETNIK} {LETO} {STEVILKA} {STRANI}
%\objavljenoZbornik
%   {AVTORJI}
%   {NASLOV}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%   {ZBORNIK} {STRANI} 

%\end{skupina} 

\begin{skupina}{C}
\objavljenoRevija
% 1.01: {\bf 1}. MILANI\v{C}, Matija, JAZBIN\v{S}EK, Vojko, MACLEOD, R. S., BROOKS, Dana H., HREN, Rok. Assessment of regularization techniques for 
%electrocardiographic imaging. {\it Journal of electrocardiology},  2014, vol. 47, no. 1, str. 20-28. $[$COBISS.SI-ID 16883289$]$\\ 
   {M.~Milani\v{c}, V.~Jazbin\v{s}ek, R.~S.~Macleod, D.~H.~Brooks, \crta}
   {Assessment of regularization techniques for electrocardiographic imaging}
   {J.\ Electrocard.} {47} {201} {1} {20--28}

\objavljenoZbornik
% 1.08: {\bf 2}. MILANI\v{C}, Matija, JAZBIN\v{S}EK, Vojko, HREN, Rok. Review of regularization techniques in electrocardiographic imaging. V: MIPRO 2014, 
%37th International Convention, May 26-30, 2014, Opatija, Croatia. BILJANOVI\'{C}, Petar (ur.). {\it MIPRO 2014 : proceedings}, (MIPRO ... (CD-ROM), 
%ISSN 1847-3946). Rijeka: Croatian Society for Information and Communication Technology, Electronics - MIPRO, cop. 2014, str. 221-226, ilustr. 
%$[$COBISS.SI-ID 17076313$]$\\ 
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3131/92: Ne najdem podatka {DRZAVA}
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3131/93: Ne najdem podatka {LETO}
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3131/94: Ne najdem podatka {ZBORNIK}
   {M.~Milani\v{c}, V.~Jazbin\v{s}ek, \crta}
   {Review of regularization techniques in electrocardiographic imaging}
   {37. me�unarodni skup za informacijsku i komunikacijsku tehnologiju, elektroniku i mikroelektroniku}
   {Rijeka} {Hrva�ka} {maj} {2014}
   {MIPRO 2014 : proceedings} {2{2}1--2{2}6} 


\objavljenoZbornik
% 1.08: %list {\bf 3}. JAZBIN\v{S}EK, Vojko, HREN, Rok. Single-dipole and dual-dipole inverse solutions in electrocardiography. V: MIPRO 2014, 37th International 
%Convention, May 26-30, 2014, Opatija, Croatia. BILJANOVI\'{C}, Petar (ur.). {\it MIPRO 2014 : proceedings}, (MIPRO ... (CD-ROM), ISSN 1847-3946). Rijeka: 
%Croatian Society for Information and Communication Technology, Electronics - MIPRO, cop. 2014, str. 227-232, ilustr. $[$COBISS.SI-ID 17076569$]$\\ 
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3140/80: Ne najdem podatka {DRZAVA}
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3140/81: Ne najdem podatka {LETO}
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3140/82: Ne najdem podatka {ZBORNIK}
   {V.~Jazbin\v{s}ek, \crta}
   {Single-dipole and dual-dipole inverse solutions in electrocardiography}
   {37. me�unarodni skup za informacijsku i komunikacijsku tehnologiju, elektroniku i mikroelektroniku}
   {Rijeka} {Hrva�ka} {maj} {2014}
   {MIPRO 2014 : proceedings} {2{2}7--232} 



\end{skupina} 

%--------------------------------------------------------
%  D. urednistvo v znanstvenih revijah in zbornikih
%     znanstvenih konferenc
%--------------------------------------------------------

%\begin{skupina}{D}

%\urednikRevija
%   {OPIS}
%   {REVIJA}
%\urednikZbornik
%   {OPIS}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%\end{skupina} 

%    Ni podatkov za to sekcijo

%--------------------------------------------------------
%  E. organizacija mednarodnih in domacih znanstvenih 
%     srecanj
%--------------------------------------------------------

%\begin{skupina}{E}

%\organizacija
%   {OPIS}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%\end{skupina} 

%   Ni podatkov za to sekcijo

%--------------------------------------------------------
%  F. vabljena predavanja na tujih ustanovah in 
%     mednarodnih konferencah
%--------------------------------------------------------

\begin{skupina}{F}

%\predavanjeUstanova
%   {NASLOV}
%   {OPIS}
%   {USTANOVA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO}
%\predavanjeKonferenca
%   {NASLOV}
%   {OPIS}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%Hren R, Trkman M, Stynes G. The importance of pharmacoeconomic modeling in assessing costs of asthma treatment. Invited presentation at the 
%First Macedonian and Fourth Adriatic Congress on Pharmacoeconomics and Outcomes Research � Abstract Book, pp. 18, 2014.

\predavanjeKonferenca
   {The importance of pharmacoeconomic modeling in assessing costs of asthma treatment}
   {vabljeno predavanje}
   {1\ust Macedonian and 4\uth Adriatic Congress on Pharmacoeconomics and Outcomes Research}
   {Ohrid} {Makedonija} {april} {2014} 
\end{skupina} 

%   Ni podatkov za to sekcijo

%--------------------------------------------------------
%  G. aktivne udelezbe na mednarodnih in domacih
%     konferencah
%--------------------------------------------------------

%\begin{skupina}{G}

%\konferenca
%   {NASLOV}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%\end{skupina} 

\begin{skupina}{G}

\konferenca
% 1.08: {\bf 2}. MILANI\v{C}, Matija, JAZBIN\v{S}EK, Vojko, HREN, Rok. Review of regularization techniques in electrocardiographic imaging. V: MIPRO 2014, 
%37th International Convention, May 26-30, 2014, Opatija, Croatia. BILJANOVI\'{C}, Petar (ur.). {\it MIPRO 2014 : proceedings}, (MIPRO ... (CD-ROM), ISSN 1847-3946)
%Rijeka: Croatian Society for Information and Communication Technology, Electronics - MIPRO, cop. 2014, str. 221-226, ilustr. $[$COBISS.SI-ID 17076313$]$\\ 
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3131/185: Ne najdem podatka {DRZAVA}
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3131/186: Ne najdem podatka {LETO}
   {Review of regularization techniques in electrocardiographic imaging}
   {37. me\-�u\-na\-rod\-ni skup za informacijsku i komunikacijsku tehnologiju, elektroniku i mikroelektroniku}
   {Rijeka} {Hrva�ka} {maj} {2014}

% 6. Hren R, �eh B, Vidmar A, Delgleize E. Cost-effectiveness of conjugate pneumococcal vaccination in Slovenia. Poster at the 32nd Annual Meeting of the
%European Society for Paediatric Infectious Diseases, Dublin, Ireland, May 9, 2014.
\konferenca
{Cost-effectiveness of conjugate pneumococcal vaccination in Slovenia}
{32\und \break Annu\-al Meeting of the European Society for Paediatric Infectious Diseases}
{Dublin} {Irska} {maj} {2014} 

%\konferenca
%% 1.08: %list {\bf 3}. JAZBIN\v{S}EK, Vojko, HREN, Rok. Single-dipole and dual-dipole inverse solutions in electrocardiography. V: MIPRO 2014, 37th 
%International Convention, May 26-30, 2014, Opatija, Croatia. BILJANOVI\'{C}, Petar (ur.). {\it MIPRO 2014 : proceedings}, (MIPRO ... (CD-ROM), ISSN 1847-3946). 
%Rijeka: Croatian Society for Information and Communication Technology, Electronics - MIPRO, cop. 2014, str. 227-232, ilustr. $[$COBISS.SI-ID 17076569$]$\\ 
%%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3140/194: Ne najdem podatka {DRZAVA}
%%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3140/195: Ne najdem podatka {LETO}
%   {Single-dipole and dual-dipole inverse solutions in electrocardiography}
%   {MIPRO 2014}
%   {Rijeka} {DRZAVA} {maj} {LETO} 

% 1. Hren R. Cost-effectiveness and budget-impact analysis of BRAF inhibitors in patients with metastatic malignant melanoma (MMM) in Slovenia. 
%Poster at the ISPOR 17th Annual European Congress, November 8-12, 2014, Amsterdam. Value in Health vol 17: A623-A624, 2014.
\konferenca
{Cost-effectiveness and budget-impact analysis of BRAF inhibitors in patients with metastatic malignant melanoma (MMM) in Slovenia}
{ISPOR 17\uth Annual European Congress}
{Amsterdam} {Nizozemska} {november} {2014} 

% 5. Hren R, Stynes G. Cost-minimization and budget-impact analysis of fixed-dose combination inhalers in treatment of COPD in Slovenia. Poster at the 
%ISPOR 17th Annual European Con-gress, November 8-12, 2014, Amsterdam. Value in Health vol 17: A592, 2014.
\konferenca
{Cost-minimization and budget-impact analysis of fixed-dose combination inhalers in treatment of COPD in Slovenia}
{ISPOR 17\uth Annual European Congress}
{Amsterdam} {Nizozemska} {november} {2014} 

% 3. Hren R, Delgleize E. The importance of sensitivity analysis in assessing clinical and economic impact of national immunization programs: 
%An example of Slovenia. Poster at the ISPOR 17th Annual European Congress, November 8-12, 2014, Amsterdam. Value in Health vol 17: A676, 2014.
\konferenca
{The importance of sensitivity analysis in assessing clinical and economic impact of national immunization programs: An example of Slovenia}
{ISPOR 17\uth Annual European Congress}
{Amsterdam} {Nizozemska} {november} {2014} 

% 2. Hren R, Camejo RR. Cost-effectiveness analysis of dolutegravir for HIV patients in Slovenia. Poster at the ISPOR 17th Annual European Congress, 
%November 8-12, 2014, Amsterdam. Value in Health vol 17: A673, 2014. ISPOR Poster Finalist Award
\konferenca
{Cost-effectiveness analysis of dolutegravir for HIV patients in Slovenia}
{nagrajen poster na ISPOR 17\uth Annual European Congress}
{Amsterdam} {Nizozemska} {november} {2014} 

% 4. Hren R, Trkman M, Stynes G. Cost-minimization and budget-impact analysis of fixed-dose ICS/LABA combination inhalers in the treatment of asthma in 
%Slovenia. Poster at the ISPOR 17th Annual European Congress, November 8-12, 2014, Amsterdam. Value in Health vol 17: A592, 2014. ISPOR Poster Finalist Award
\konferenca
{Cost-minimization and budget-impact analysis of fixed-dose ICS/LABA combination inhalers in the treatment of asthma in Slovenia}
{nagrajen poster na ISPOR 17\uth Annual European Congress}
{Amsterdam} {Nizozemska} {november} {2014} 


\end{skupina} 

%--------------------------------------------------------
%  H. strokovni clanki
%--------------------------------------------------------

%\begin{skupina}{H}

%\clanekRevija
%   {AVTORJI}
%   {NASLOV}
%   {REVIJA} {LETNIK} {LETO} {STEVILKA} {STRANI}
%\clanekZbornik
%   {AVTORJI}
%   {NASLOV}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO}
%   {ZBORNIK} {STRANI} 

%\end{skupina} 

%   Ni podatkov za to sekcijo

%--------------------------------------------------------
%  I. razno
%--------------------------------------------------------

%\begin{skupina}{I}

%\razno
%   {OPIS} 

%\end{skupina} 

%\begin{skupina}{I}
%POZOR: Bibliografija2014A.tex > 2014\fiz\clani\hren.tex 3162/236: Stevilo neopredeljenih zadetkov: 2
%\razno
% Rece: {\bf 4}. {\it Medical \& biological engineering \& computing}. Hren, Rok (recenzent 1998-). $[$Print ed.$]$. Stevenage: Peter Peregrinus, 1977-. ISSN 0140-0118. $[$COBISS.SI-ID 25920768$]$\\ 

%\razno
% Rece: %list {\bf 5}. {\it Physics in Medicine \& Biology}. Hren, Rok (recenzent 1999-). London: American Institute of Physics. ISSN 0031-9155. $[$COBISS.SI-ID 26128896$]$\\ 

%\end{skupina} 

%--------------------------------------------------------
%  tuji gosti
%--------------------------------------------------------

%\begin{seznam}
%\gost {IME} {TRAJANJE} {USTANOVA} {KRAJ} {DRZAVA} {MESEC} {LETO} {POVABILO}
%\end{seznam} 

%--------------------------------------------------------
%  gostovanja
%--------------------------------------------------------

%\begin{seznam}
%\gostovanje {IME} {TRAJANJE} {USTANOVA} {KRAJ} {DRZAVA} {MESEC} {LETO}
%\end{seznam} 


%\vfill
