\clan {Urban Marhl}

%--------------------------------------------------------
%  A. objavljene znanstvene monografije
%--------------------------------------------------------


%\begin{skupina}{A}

%\disertacija
%   {NASLOV}
%   {UNIVERZA}
%   {FAKULTETA}
%   {ODDELEK}
%   {KRAJ} {DRZAVA} {LETO} 

%\magisterij
%   {NASLOV}
%   {UNIVERZA}
%   {FAKULTETA}
%   {ODDELEK}
%   {KRAJ} {DRZAVA} {LETO} 

%\monografija
%   {AVTORJI}
%   {NASLOV}
%   {ZALOZBA}
%   {KRAJ} {DRZAVA} {LETO} 

%\poglavje   
% 
%   {AVTORJI}
%   {NASLOV}
%   {MONOGRAFIJA} {STRANI}
%   {ZALO�BA} {KRAJ} {DRZAVA} {2020} 


%\end{skupina} 




%   Ni podatkov za to sekcijo

%--------------------------------------------------------
%  B. raziskovalni clanki sprejeti v objavo v znanstvenih
%     revijah in v zbornikih konferenc
%--------------------------------------------------------

%\begin{skupina}{B}

%\sprejetoRevija
%   {AVTORJI}
%   {NASLOV}
%   {REVIJA}

%\sprejetoZbornik
%   {AVTORJI}
%   {NASLOV}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 
   
%\sprejetoPoglavje   
% 
%   {AVTORJI}
%   {NASLOV POGLAVJA}
%   {NASLOV MONOGRAFIJE} {ZALO�BA} {KRAJ, DR�AVA} 

%\end{skupina} 

\begin{skupina}{B}

\sprejetoZbornik
%2. MARHL, Urban, JODKO-WLADZINSKA, Anna, BR�HL, R�diger, SANDER, Tilmann, JAZBIN�EK, Vojko. Comparison between conventional SQUID based and novel OPM based measuring systems in MEG. V: JARM, Toma� (ur.), et al. Proceedings of the EMBEC 2020 : 8th European Medical and Biological Engineering Conference, November 29 - December 3, 2020 Portoro�, Slovenia, 8th European Medical and Biological Engineering Conference, November 29 - December 3, 2020 Portoro�, Slovenia, (IFMBE proceedings (Online), ISSN 1433-9277, vol. 80). Cham: Springer Nature. cop. 2021, str. 254-261. https://doi.org/10.1007/978-3-030-64610-3_30, doi: 10.1007/978-3-030-64610-3_30. [COBISS.SI-ID 46209027], [SNIP, Scopus do 16. 2. 2021: �t. citatov (TC): 0, cistih citatov (CI): 0, cistih citatov na avtorja (CIAu): 0]
   {\crta,  A.~Jodko-W�adzinska,  R.~Br�hl,  T.~Sander,  V.~Jazbin�ek} 
   {Comparison between conventional SQUID based and novel OPM based measuring systems in MEG}
   {Proceedings of the EMBEC 2020: 8\uth European Medical and Biological Engineering Conference}
   {Portoro�} {} {november/december} {2020} 

\end{skupina} 

%   Ni podatkov za to sekcijo

%--------------------------------------------------------
%  C. raziskovalni clanki objavljeni v znanstvenih revijah
%     in v zbornikih konferenc
%--------------------------------------------------------

%\begin{skupina}{C}

%\objavljenoRevija
%   {AVTORJI}
%   {NASLOV}
%   {REVIJA} {LETNIK} {LETO} {STEVILKA} {STRANI}

%\objavljenoZbornik
%   {AVTORJI}
%   {NASLOV}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 
%   {ZBORNIK} {STRANI} 

%\end{skupina} 

%   Ni podatkov za to sekcijo


%--------------------------------------------------------
%  D. urednistvo v znanstvenih revijah in zbornikih
%     znanstvenih konferenc
%--------------------------------------------------------

%\begin{skupina}{D}

%\urednikRevija
%   {OPIS}
%   {REVIJA}
%\urednikZbornik
%   {OPIS}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%\end{skupina} 

%    Ni podatkov za to sekcijo


%--------------------------------------------------------
%  E. organizacija mednarodnih in domacih znanstvenih 
%     srecanj
%--------------------------------------------------------

%\begin{skupina}{E}

%\organizacija
%   {OPIS}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%\end{skupina} 

%    Ni podatkov za to sekcijo


%--------------------------------------------------------
%  F. vabljena predavanja na tujih ustanovah in 
%     mednarodnih konferencah
%--------------------------------------------------------

%\begin{skupina}{F}

%\predavanjeUstanova
%   {NASLOV}
%   {OPIS}
%   {USTANOVA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO}
%\predavanjeKonferenca
%   {NASLOV}
%   {OPIS}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%\end{skupina} 

%   Ni podatkov za to sekcijo




%--------------------------------------------------------
%  G. aktivne udelezbe na mednarodnih in domacih
%     konferencah
%--------------------------------------------------------

%\begin{skupina}{G}

%\konferenca
%   {NASLOV}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO} 

%\end{skupina} 

%   Ni podatkov za to sekcijo

\begin{skupina}{G}

\konferenca
% 2. MARHL, Urban, JODKO-WLADZINSKA, Anna, BR�HL, R�diger, SANDER, Tilmann, V.~Jazbin�ek. Comparison between conventional SQUID based and novel OPM based measuring systems in MEG. V: JARM, Toma� (ur.), et al. Abstract book : 8th European Medical and Biological Engineering Conference (EMBEC 2020 ) : 29 November - 3 December, Portoro�, Slovenia. 1. elektronska izd. Ljubljana: Zalo�ba FE, 2020. Str. 98. ISBN 978-961-243-411-3. https://www.embec2020.org/wp-content/uploads/2020/11/EMBEC2020_Book_of_Abstracts.pdf. [COBISS.SI-ID 46195971] 
   {Comparison between conventional SQUID based and novel OPM based measuring systems in MEG}
   {8\uth European Medical and Biological Engineering Conference (EMBEC 2020)}
   {Portoro�} {} {november/december} {2020} 

%  \konferenca
%. V.~Jazbin�ek, MARHL, Urban, SANDER, Tilmann. Optimal positioning of limited number of OPM sensors in MEG. V: JARM, Toma� (ur.), et al. Abstract book : 8th European Medical and Biological Engineering Conference (EMBEC 2020 ) : 29 November - 3 December, Portoro�, Slovenia. 1. elektronska izd. Ljubljana: Zalo�ba FE, 2020. Str. 278. ISBN 978-961-243-411-3. https://www.embec2020.org/wp-content/uploads/2020/11/EMBEC2020_Book_of_Abstracts.pdf. [COBISS.SI-ID 46196995]  
%    {Optimal positioning of limited number of OPM sensors in MEG.}
%    {8\uth European Medical and Biological Engineering Conference (EMBEC 2020)}
%    {Portoro�} {} {november/december} {2020} 

\end{skupina} 


%--------------------------------------------------------
%  H. strokovni clanki
%--------------------------------------------------------

%\begin{skupina}{H}

%\clanekRevija
%   {AVTORJI}
%   {NASLOV}
%   {REVIJA} {LETNIK} {LETO} {STEVILKA} {STRANI}
%\clanekZbornik
%   {AVTORJI}
%   {NASLOV}
%   {KONFERENCA}
%   {KRAJ} {DRZAVA} {MESEC} {LETO}
%   {ZBORNIK} {STRANI} 

%\end{skupina} 

%   Ni podatkov za to sekcijo


%--------------------------------------------------------
%  I. razno
%--------------------------------------------------------

%\begin{skupina}{I}

%\razno
%   {OPIS} 

%  \end{skupina} 

%   Ni podatkov za to sekcijo



%--------------------------------------------------------
%  tuji gosti
%--------------------------------------------------------

%\begin{seznam}
%\gost {IME} {TRAJANJE} {USTANOVA} {KRAJ} {DRZAVA} {MESEC} {LETO} {POVABILO}
%\end{seznam} 

%--------------------------------------------------------
%  gostovanja
%--------------------------------------------------------

%\begin{seznam}
%\gostovanje {IME} {TRAJANJE} {USTANOVA} {KRAJ} {DRZAVA} {MESEC} {LETO}
%\end{seznam} 

